Title: Module 1 Instructions
Course: HIM 3600 - TAACCCT Grant > Section: Module 1

1.  Acquire the text:  Lame and Young (2014). A guided approach to intermediate and advanced coding. Upper Saddle River, NJ:  Pearson Education, Inc. ISBN 978-0-13-292071-1

2.  Read Chapters 1 and 2.  Take the Chapter review quizzes (one for chapter 1 and one for chapter 2).

3.  Locate online the official coding guidelines effective 10/1/2015 for federal fiscal year 2016 for the ICD-10 coding sets.  Review the official coding guidelines and  prepare a 1-2 page document that discusses how these guidelines have changed or evolved with the new code sets.