Title: Logic Circuits 1 Lesson Objectives & References
Course: AIT 198 Special Seminar - Logic For Industry > Section: Week 1: Fundamental Logic Circuits 1

The module learning outcomes (MLOs) expected from this module of study are for the student to be able to:

MLO 1. Identify general logic conditions and logic states as these terms apply to the inputs and outputs of fundamental logic circuits.
MLO 2. Identify variations of the fundamental logic gates and recognize the associated truth tables.
MLO 3.Identify the following logic circuit gates:

AND
OR
NAND
NOR
Inverters (NOT circuits)

Accessibility for Technology Tools

Technology Tool Privacy Information

This module of study is derivative work adapted from:

United States Navy. (1998). Navy Electricity and Electronics Training Series (NAVEDTRA 14185). Pensacola, Florida. Naval Education and Training Professional Development and Technology Center.

Lessons in Electric Circuits: Volume IV – Digital by Kuphaldt , T.R. (2006) licensed under a Design Science License.

Gates, E. (2014). Introductions to Basic Electricity and Electronics Technology. Clifton Park, NY: Delmar.

Ineractive lab modules have been retrieved from  Wisc-Online, except where otherwise noted.

Wisc-Online by Fox Valley Technical College is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.

"Logic Lab" by Temmerman, K. is licensed under a Creative Commons Attribution 3.0 Unported License (Links to an external site.)