Title: References
Course: AIT 198 Special Seminar - Logic For Industry

References and Links to More Information:

Voltage Divider Module material adapted from the following Public Domain document:

(1998). Navy Electricity and Electronics Training Series Module 1 Introduction to Matter, Energy, and Direct Current [PDF]. Retrieved from https://archive.org/details/NeetsModule1introductionToMatterEnergyAndDirectCurrent